EECS 210 Introduction to Electrical Engineering I

Fall 2000

Hwk Assignment 4: Due Wed. Oct. 4, 2000

Reading: Secs. 4.1-4.2, 4.4-4.13 Do the following exercises out of the Nilsson and Riedel textbook.

1. Ex 3.7 2. Ex 3.18 3. Ex 3.19 4. Ex 4.3 5. Ex 4.9 6. Ex 4.16 7. Ex 4.27 8. Ex 4.31