0 1 2 3 4 5 6 7 8 9 10 -60 -40 -20 0 20 40 Hip controls u_1 (Nm) u_2 (Nm)

0 1 2 3 4 5 6 7 8 9 10 -20 -10 0 10 20

Knee controls

time (sec) u_3 (Nm) u_4 (Nm)